Counts

1

10

210

(ps) π〉tΔ〈−tΔ 2000

− 1000

− 0 1000 2000 3000 4000 5000 6000

(a.u.) π〉 /dx Ed〈− /dx Ed

30− 20− 10− 0 10 20 30 ALICE | < 0.5 y = 13 TeV, | s pp,

c < 1.60 GeV/ Tp 1.50 <

0.01%) − HM I (0

π K p

Fit region

Mismatch region

ALI-PUB-621184

ALI-PUB-621184